-- 为 mdm_project 表添加初始化状态字段
ALTER TABLE mdm_project ADD COLUMN IF NOT EXISTS initialized BOOLEAN NOT NULL DEFAULT FALSE;

COMMENT ON COLUMN mdm_project.initialized IS '是否已完成初始化向导';
